;
                                 IOPCLK.COM                                   

             Size (recs) CRC   Version    Author/Latest Issue      Disk
               3k (17)   7617  1.0        Terry Hazen 9/91         Z3COM10

  1- Syntax/Options  2- Help File  3- IOPCLK.HLP                              


   IOPCLK loads and removes a ZSDOS clock  NZCOM IOP  module which runs in the
background to display the current date and time in a  specified  host computer
message field on your terminal.   IOPCLK  updates  its  display  every  second
(mm/dd/yy hh:mm:ss)  but  can  be  configured  to  update   it   every  minute
(mm/dd/yy hh:mm).   IOPCLK must be configured (using ZCNFG) for your terminal.
See IOPCLK.HLP for details on usage.
:1
 Syntax   IOPCLK    - If no option specified, install IOPCLK as configured
          IOPCLK R  - Remove IOPCLK 
          IOPCLK D  - Toggle the default time display (seconds<->minutes)

 Options 

          R - Remove IOPCLK.  IOPCLK isn't actually removed, it's just 
              reconfigured so that it passes on all BIOS calls without
              intercepting them.

          D - Toggle the default time display configuration.  The time
              display will be toggled between 'hh:mm:ss' and 'hh:mm', 
              with the update time changing accordingly.  
:2
                               IOPCLK.HLP 

             Size (recs) CRC   Version    Author/Latest Issue      Disk
               9k (72)   AC8A  1.0        Terry Hazen 9/91         Z3COM10
==============================================================================

   ZCPR3 Help file on usage of IOPCLK.COM vs 1.0.
:3 :IOPCLK
